)c (GeV/

A/_Tp

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

)^3c/^2 (GeV 2B

0.01

0.02

0.03

0.04

= 2.1 GeV bE d, Bevalac p-A = 53 GeV s , ISR pp d = 200 GeV s pγ , H1 d = 300 GeV s , ZEUS ep d = 7 TeV s , ALICE pp d